
Enter the tab stops, separated by commas. The total length of your entry cannot
exceed 159 characters. The display will scroll left and right as needed when
you enter the tab stops. This changes the tabs for the current session. The
tab settings are saved when you select the option to save editor parameters.
    
    Enter - confirm entry and set tabs
    HOME - go to beginning of entry
    END  - go to end of entry
    INS  - toggle insert mode
    DEL  - delete character under cursor
    Left arrow/right arrow - move cursor left and right
    Backarrow - delete character before cursor
    
    ESC - cancel entry and return to edit mode
